Figure 1. The Arp 269 System.

H i: VLA C+D-array, 38^{′′} × 33^{′′} resolution, contours=5 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=30^′ × 30^′.

Reference: Clemens, M. S., Alexander, P., & Green, D. A. 1998, MNRAS, 297, 1015.