Figure 1. The Toomre Sequence merger NGC 4676. H i: VLA C+D-array, 12^{′′} resolution, contours=1 × 10^{20} cm^{−2} × 2^n. Optical: KPNO 2.1m B-band, FOV=3^′ × 5^′.

Notes: There is an Hi detected companion lying 12.8^′ to the south (NGC 4676S) with no optical counterpart visible on the DSS. Reference: Hibbard, J. E. & van Gorkom, J. H. 1996, AJ, 111, 655.