Figure 1. The Blue Compact Dwarf NGC 4861.

H i: VLA C-array. Lower panels: contours at 5 × 10^{19} cm^{−2} × 2^n, 19^{′′} × 15^{′′} resolution. Lower right: Hi at 35^{′′} resolution, greyscales range from 5×10^{19} − 2 × 10^{20} cm^{−2}.

Optical: DSS, FOV=7^′ × 8^′ (top), 10.8^′ × 9.6^′ (lower right). Notes: The low resolution Hi data reveal an extended envelope and an Hi companion which has no apparent counterpart on the DSS image. Reference: Thuan, Hibbard & Levrier, these proceedings, p. ??.