Figure 1. The NGC 5506/7 System.

H i: VLA C-array, 21.6^{′′} × 19.8^{′′} resolution, contours=4 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=18^′ × 16^′.

Notes: A lower resolution Hi map of this system showing more widely distributed gas is shown in Fig. ??.

Reference: Mundell, these proceedings, p. ??.