Figure 1. The NGC 5774/5 System.

H i: VLA CnB-array, 29^{′′} × 23^{′′} resolution, contours=1 × 10^{20} cm^{−2} × 2^n. Optical: DSS, FOV=11^′ × 10^′.

Reference: Irwin, J. A. 1994, ApJ, 429, 618.