Figure 1. The NGC 5903 System.

H i: VLA DnC-array, 46^{′′} × 45^{′′} resolution, contoured at (0.6, 1.2, 1.7, 2.3, 2.9, 3.5, 4.1, 4.7, 5.2) × 10^{20} cm^{−2}. Optical: DSS, FOV=12^′ × 22^′.

Notes: ESO 512−G003 does not have a known redshift.

Reference: Appleton, P. N., Pedlar, A., & Wilkinson, A. 1990, ApJ, 357, 426.