Figure 1. The IR luminous merger NGC 6240. H i: VLA C+D-array, 25^{′′} resolution, contours=5 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=5^′ × 6^′.

Notes: The companion to the south has no cataloged counterpart. Reference: Yun & Hibbard, these proceedings, p. ??.