Figure 1. The NGC 7213 System.

H i: ATCA, 52^{′′} × 42^{′′} resolution, contours=5 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=17^′ × 16^′.

Notes: The gradient to the northwest is due to the presence of a bright star. Reference: Hameed, S., Blank, D. L., Young. L. M., & Devereux, N. 2001, ApJ, 546, L97.