Figure 1. The Toomre Sequence merger NGC 7252. H i: VLA C+D-array, 27^{′′} × 16^{′′} resolution, contours=4 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=17^′ × 13^′ (top panels) and CTIO 4m R-band, FOV= 12^′ × 8^′ (bottom panels).

Notes: The bright Hi clump in the northwest tail is associated with a putative Tidal Dwarf Galaxy.

Reference: Hibbard, J.E., Guhathakurta, P., van Gorkom, J. H., & Schweizer, F. 1994, AJ, 107, 67.