Figure 1. The NGC 7619/7626 System.

H i: VLA D-array, 54^{′′} × 50^{′′} resolution, contours=1 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=17^′ × 10^′.

Notes: The central galaxies of the Pegasus I group in the Pegasus Cluster — see also Fig. ??.

Reference: Observations centered on NGC 7626: Hibbard & Sansom, these proceedings, p. ??. Observations centered on NGC 7617: Schiminovich et al., these proceedings, p. ??.