Figure 1. The NGC 7769/7771 System.

H i: VLA D-array, 67^{′′} × 52^{′′} resolution, contours=1 × 10^{19} cm^{−2} × 2^n. Optical: Top panels: Palomar 5m Gunn r, FOV=12^′ ×8^′. Bottom left panel: DSS, FOV=20^′ ×^′ 21.

Reference: Nordgren, T. E., Chengalur, J. N., Salpeter, E. E., & Terzian, Y. 1997, AJ, 114, 77.