Figure 1. Peculiar Early Types Undetected in H i. H i: Hi upper limits are in the range of a few 10^7 M_⊙. See Sansom, A.E., Hibbard, J.E., & Schweizer, F., 2001, AJ, 120, 1946. Optical: DSS.

Notes: For each system, the value of the Fine Structure Index (FSI), a quantitative measure of optical morphological peculiarity, is listed. See Schweizer, F., & Seitzer, P. 1992, AJ, 104, 1039.

Reference: NGC 3610, NGC 3640 and NGC 5322: Hibbard & Sansom, these proceedings, p. ??. NGC 596, NGC 7585 and NGC 7600: Schiminovich et al., these proceedings, p. ??.