Figure 1. The Pegasus I Group.

H i: VLA D-array, 54^{′′} × 50^{′′} resolution, contours=1 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=40^′ × 20^′.

Notes: The contours represent the combination of two separate observations: a pointing centered on NGC 7626 (3423 km s^{−1}) which found Hi in the galaxy UGC 12510 and in cloud lying between NGC 7626 and NGC 7619; and a separate pointing centered on NGC 7617 (4010 km s^{−1}) which found everything else.

Reference: Observations centered on NGC 7626: Hibbard & Sansom, these proceedings, p. ??. Observations centered on NGC 7617: Schiminovich et al., these proceedings, p. ??.