Figure 1. The Blue Compact Dwarf UGC 521. H i: VLA CS-array, 19^{′′} × 17.4^{′′} resolution, contours=8 × 10^{19} cm^{−2} × 2^n. Optical: Left: DSS. Right: KPNO 0.9m B-band. FOV=5^′ × 7^′. Reference: van Zee & Haynes, these proceedings, p. ??.