Figure 1. The low-luminosity elliptical UGC 1503. H i: VLA D-array, 55^{′′} × 49^{′′} resolution, contours=1 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=4^′ × 4^′.

Notes: The Hi distribution in this system is fairly typical of low luminosity ellipticals as a class; see Oosterloo et al., these proceedings, p. ??. Reference: Schiminovich et al., these proceedings, p. ??.